%window
%structure    xs1607a
%init
%job   xs1607a in F m -3 m
%data
         Cell      8.364   8.364   8.364  90.000  90.000  90.000
         Space   F m -3 m
         Content   Ba 8 Ca 4 O 24 W 4
         Rhomax    0.250
         Reflections   xs1607a.hkl
         Format  (3i4,2f8.0)
         Fosquare
%normal
%invariants
%phase
%fourier
%export
         shelx  xs1607a.res
%end
