%window
%structure    l
%init
%job
%data
         Cell      5.909   5.910   8.357  89.976  90.011  90.000
         Space   C 1 2/m 1
         Content   Ba 4 Ca 2 O 12 W 2
         Rhomax    0.250
         Reflections   l.t.monoclinic.hkl
         Format  (3i4,2f8.0)
         Fosquare
%normal
%invariants
%phase
%fourier
%export
         shelx  l.res
%end
