%window
%structure    xs1607a
%init
%job   xs1607a in I 1 2/m 1
%data
         Cell      5.914   5.914   8.362  90.000  90.009  90.000
         Space   I 1 2/m 1
         Content   Ba 4 Ca 2 O 12 W 2
         Rhomax    0.250
         Reflections   xs1607a.hkl
         Format  (3i4,2f8.0)
         Fosquare
%normal
%invariants
%phase
%fourier
%export
         shelx  xs1607a.res
%end
